\documentclass{article}
\usepackage[margin=1cm]{geometry}
\usepackage{cite}

\title{***Name of project***}
\author{***Authors***}

\begin{document}
\maketitle

\section{Value propositions}

\section{Detailed description of customer segment addressed}

\section{Summary of evidence for user/customer demand}

\begin{enumerate}

\item Number of interviews: ***

\item Number of interviewees who turned out to be potential customers: ***

\item Number of interviewees who identified value propositions as important
  before revealing them explicitly: ***

\item Number of interviewees who identified value propositions as important
  after revealing them explicitly: ***

\item Additional summary, including significant findings from customer
  interviews.

\end{enumerate}

\section{Evidence that there is sufficient demand in the world to provide the
  required resources for development}

\section{Description of embedded system design}

\subsection{Architectural overview ***you will probably need a diagram in this subsection***}

\subsection{Formal problem definition}

\subsection{Related industrial and academic work}
\cite{test09may}

\subsection{***Descriptions of system components***}

\section{Evaluation}

\section{Future work}

\bibliographystyle{IEEEtrannames}
\bibliography{esaca}

\end{document}
